<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.58


######### Lightcurve features #########

amplitude  =  0.317872628044
cusum  =  0.124583064151
eta  =  1.36270253612
hl_amp_ratio  =  0.274554626781
kurtosis  =  4.31016082522
n_points  =  232
period  =  0.357038430604
period_SNR  =  10.8263287632
period_log10FAP  =  -1.10095673714
period_uncertainty  =  3.56795812875e-05
phase_cusum  =  0.190098409265
phase_eta  =  1.44879782189
phi21  =  3.18147047278
phi31  =  5.6447624161
quartile31  =  0.39
r21  =  0.421754450395
r31  =  0.191442290916
shapiro_w  =  0.785614848137
skewness  =  -1.91466183677
slope_per10  =  -0.0273164878762
slope_per90  =  0.0286847142679
stetson_k  =  0.533738120172
weighted_mean  =  15.5126544583
weighted_std  =  0.681092882518
</pre></body></html>