-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.354097469177
cusum  =  0.120752266274
eta  =  0.545227622335
hl_amp_ratio  =  0.447185858036
kurtosis  =  -0.0395231319383
n_points  =  398
period  =  0.568201673394
period_SNR  =  47.3879186543
period_log10FAP  =  -51.6445910116
period_uncertainty  =  0.000104257191289
phase_cusum  =  0.269770605468
phase_eta  =  0.356454815684
phi21  =  0.650044566222
phi31  =  1.96146431504
quartile31  =  0.3275
r21  =  0.431285479913
r31  =  0.190393554157
shapiro_w  =  0.931124329567
skewness  =  -0.81704635897
slope_per10  =  -0.0747356730034
slope_per90  =  0.0660184645367
stetson_k  =  0.732275609832
weighted_mean  =  15.1207945005
weighted_std  =  0.270332630926
