-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.353402780564
cusum  =  0.22043841919
eta  =  1.10059437045
hl_amp_ratio  =  0.74002412761
kurtosis  =  -0.475294007352
n_points  =  372
period  =  0.630684968527
period_SNR  =  38.5106619173
period_log10FAP  =  -31.2120793997
period_uncertainty  =  0.00011028274936
phase_cusum  =  0.302971342234
phase_eta  =  1.1710127505
phi21  =  -2.23979348998
phi31  =  -3.37762447405
quartile31  =  0.6
r21  =  0.406079218281
r31  =  0.0877338206753
shapiro_w  =  0.990596950054
skewness  =  0.0778429042295
slope_per10  =  -0.0305373838963
slope_per90  =  0.0365849592515
stetson_k  =  0.761222508838
weighted_mean  =  19.2369713282
weighted_std  =  0.391442746352
