-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.333143260347
cusum  =  0.0894126942029
eta  =  0.641348788076
hl_amp_ratio  =  0.309457948605
kurtosis  =  0.126078952674
n_points  =  406
period  =  0.619422413655
period_SNR  =  42.9112902945
period_log10FAP  =  -45.5634727174
period_uncertainty  =  0.000103243954626
phase_cusum  =  0.239834422493
phase_eta  =  0.379111133861
phi21  =  3.96966803801
phi31  =  5.05123141358
quartile31  =  0.3475
r21  =  0.481584164586
r31  =  0.293584652082
shapiro_w  =  0.880614042282
skewness  =  -0.925302634583
slope_per10  =  -0.108794780893
slope_per90  =  0.192333654998
stetson_k  =  0.695035866362
weighted_mean  =  15.4412336539
weighted_std  =  0.2715086413
