-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.259462183454
cusum  =  0.214924042131
eta  =  0.483550588315
hl_amp_ratio  =  0.494181039331
kurtosis  =  -0.983500178189
n_points  =  272
period  =  0.631202536408
period_SNR  =  33.4428547723
period_log10FAP  =  -34.8415108692
period_uncertainty  =  0.000148978958653
phase_cusum  =  0.296493364289
phase_eta  =  0.296331271168
phi21  =  0.952209159642
phi31  =  -0.978562556223
quartile31  =  0.38
r21  =  0.482839066056
r31  =  0.294168148068
shapiro_w  =  0.908611893654
skewness  =  -0.559728138636
slope_per10  =  -0.161850931073
slope_per90  =  0.228610856671
stetson_k  =  0.783864487563
weighted_mean  =  15.7207595158
weighted_std  =  0.244454177089
