-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.208969153146
cusum  =  0.098853565699
eta  =  0.6718091711
hl_amp_ratio  =  0.741001579522
kurtosis  =  -0.542008311753
n_points  =  241
period  =  0.598270252776
period_SNR  =  36.5027953046
period_log10FAP  =  -29.8357465343
period_uncertainty  =  0.000152965594186
phase_cusum  =  0.243467156469
phase_eta  =  0.172203800061
phi21  =  1.09842096747
phi31  =  2.68020352855
quartile31  =  0.28
r21  =  0.493210897102
r31  =  0.28479466797
shapiro_w  =  0.969500660896
skewness  =  -0.399472888997
slope_per10  =  -0.17799998944
slope_per90  =  0.238333347564
stetson_k  =  0.805497803116
weighted_mean  =  13.2947049464
weighted_std  =  0.179632869345
