-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.378298325095
cusum  =  0.129510525476
eta  =  0.54278972979
hl_amp_ratio  =  0.262436160755
kurtosis  =  -0.276862416935
n_points  =  299
period  =  0.617948249944
period_SNR  =  36.0372961757
period_log10FAP  =  -30.7963193584
period_uncertainty  =  0.00011484319626
phase_cusum  =  0.224434766213
phase_eta  =  0.497232516059
phi21  =  -2.36795204331
phi31  =  -4.43241801295
quartile31  =  0.475
r21  =  0.469781592773
r31  =  0.255159994169
shapiro_w  =  0.858941316605
skewness  =  -0.983429065123
slope_per10  =  -0.104341881919
slope_per90  =  0.237852735535
stetson_k  =  0.677120176926
weighted_mean  =  13.3357671111
weighted_std  =  0.359881712645
