-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.360410782151
cusum  =  0.268152933509
eta  =  1.14197662912
hl_amp_ratio  =  0.787778816597
kurtosis  =  -0.295172365278
n_points  =  377
period  =  0.551733582966
period_SNR  =  46.5721581456
period_log10FAP  =  -34.6242100948
period_uncertainty  =  0.00010127268751
phase_cusum  =  0.372147207289
phase_eta  =  0.845373817138
phi21  =  1.08245206757
phi31  =  1.6129449471
quartile31  =  0.51
r21  =  0.436777302126
r31  =  0.253362860091
shapiro_w  =  0.993689537048
skewness  =  0.0762253877259
slope_per10  =  -0.0255738015761
slope_per90  =  0.0305618511916
stetson_k  =  0.739910946105
weighted_mean  =  19.0731730533
weighted_std  =  0.366607949424
