-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.342476696627
cusum  =  0.147232431851
eta  =  0.567369673175
hl_amp_ratio  =  0.369478023357
kurtosis  =  -0.852117666554
n_points  =  345
period  =  0.585214583715
period_SNR  =  41.3564360292
period_log10FAP  =  -44.0878105944
period_uncertainty  =  0.000114732964228
phase_cusum  =  0.281665426865
phase_eta  =  0.251490458123
phi21  =  -2.35149268752
phi31  =  -1.3067425313
quartile31  =  0.53
r21  =  0.475756241944
r31  =  0.307981902415
shapiro_w  =  0.894875586033
skewness  =  -0.663267643916
slope_per10  =  -0.142199993134
slope_per90  =  0.173113196441
stetson_k  =  0.753147958617
weighted_mean  =  15.9296078064
weighted_std  =  0.327968559973
