-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.38


######### Lightcurve features #########

amplitude  =  0.286323018738
cusum  =  0.177963919914
eta  =  0.495427573548
hl_amp_ratio  =  0.700250895529
kurtosis  =  -0.284729908587
n_points  =  113
period  =  0.779004057764
period_SNR  =  16.4824984312
period_log10FAP  =  -12.8884582225
period_uncertainty  =  0.000173590358967
phase_cusum  =  0.337158614081
phase_eta  =  0.373972838525
phi21  =  0.569247002213
phi31  =  0.400807454641
quartile31  =  0.33
r21  =  0.218798415489
r31  =  0.135525751404
shapiro_w  =  0.959574639797
skewness  =  -0.531100328323
slope_per10  =  -0.314852949199
slope_per90  =  0.265976190772
stetson_k  =  0.822425881506
weighted_mean  =  12.7618584071
weighted_std  =  0.210753173892
