-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.243511667687
cusum  =  0.091756065951
eta  =  0.679068488206
hl_amp_ratio  =  0.550396254476
kurtosis  =  -0.488066873924
n_points  =  180
period  =  0.65360307639
period_SNR  =  24.382261931
period_log10FAP  =  -17.6866508284
period_uncertainty  =  0.000125838101588
phase_cusum  =  0.260921716743
phase_eta  =  0.414945734091
phi21  =  -2.17041862231
phi31  =  -3.88117180377
quartile31  =  0.295
r21  =  0.457089960107
r31  =  0.203751201452
shapiro_w  =  0.958536267281
skewness  =  -0.530284590809
slope_per10  =  -0.237854974661
slope_per90  =  0.312504125156
stetson_k  =  0.77359760185
weighted_mean  =  14.3931443569
weighted_std  =  0.221286771895
