-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.51


######### Lightcurve features #########

amplitude  =  0.207579178829
cusum  =  0.195935223642
eta  =  1.39569255188
hl_amp_ratio  =  1.10212609073
kurtosis  =  0.0864158661196
n_points  =  396
period  =  0.720653215056
period_SNR  =  39.1477628205
period_log10FAP  =  -24.854584844
period_uncertainty  =  0.000143969402803
phase_cusum  =  0.191542081703
phase_eta  =  1.35115897055
phi21  =  -1.8369281661
phi31  =  -3.2266523728
quartile31  =  0.3625
r21  =  0.386122896253
r31  =  0.321014219062
shapiro_w  =  0.977173745632
skewness  =  0.483052117256
slope_per10  =  -0.0540248195471
slope_per90  =  0.0463848589958
stetson_k  =  0.828340533763
weighted_mean  =  18.8399455676
weighted_std  =  0.236801349495
