-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.64


######### Lightcurve features #########

amplitude  =  0.291436450322
cusum  =  0.285093989964
eta  =  0.288136326702
hl_amp_ratio  =  1.36450014273
kurtosis  =  0.24617890282
n_points  =  328
period  =  0.596046182832
period_SNR  =  24.2494414435
period_log10FAP  =  -21.7015984616
period_uncertainty  =  0.000101361505914
phase_cusum  =  0.226717265044
phase_eta  =  1.00707553121
phi21  =  -1.48967258942
phi31  =  -2.66267180951
quartile31  =  0.3825
r21  =  0.245644448698
r31  =  0.110046981019
shapiro_w  =  0.949725925922
skewness  =  0.65619497799
slope_per10  =  -0.127139663429
slope_per90  =  0.185028210129
stetson_k  =  0.759371861949
weighted_mean  =  11.0918413021
weighted_std  =  0.320399622107
