-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.68


######### Lightcurve features #########

amplitude  =  0.196620384588
cusum  =  0.162037787067
eta  =  1.2420280727
hl_amp_ratio  =  1.03928568415
kurtosis  =  -0.343158750927
n_points  =  329
period  =  0.864154344035
period_SNR  =  35.151085324
period_log10FAP  =  -23.9899484134
period_uncertainty  =  0.000248439218627
phase_cusum  =  0.262945390081
phase_eta  =  1.17199526347
phi21  =  1.26958195001
phi31  =  2.2649906147
quartile31  =  0.32
r21  =  0.341077008084
r31  =  0.229506518181
shapiro_w  =  0.990486681461
skewness  =  0.201987067199
slope_per10  =  -0.0618473872146
slope_per90  =  0.0655961303442
stetson_k  =  0.824504553968
weighted_mean  =  18.4244536184
weighted_std  =  0.209136822584
