-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.381776505392
cusum  =  0.151455624453
eta  =  0.709607166042
hl_amp_ratio  =  0.296737325552
kurtosis  =  -0.856127866272
n_points  =  182
period  =  0.570217638562
period_SNR  =  28.0664106566
period_log10FAP  =  -21.9634008467
period_uncertainty  =  0.000153274019072
phase_cusum  =  0.294564109953
phase_eta  =  0.342963693485
phi21  =  0.819332473435
phi31  =  -0.915500736735
quartile31  =  0.57
r21  =  0.398601933073
r31  =  0.221324229262
shapiro_w  =  0.883055567741
skewness  =  -0.707348661934
slope_per10  =  -0.139583216876
slope_per90  =  0.317033322838
stetson_k  =  0.73884406498
weighted_mean  =  14.1822004304
weighted_std  =  0.343595247279
