-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.37


######### Lightcurve features #########

amplitude  =  0.373749615212
cusum  =  0.189558000493
eta  =  1.18298135538
hl_amp_ratio  =  0.796014912065
kurtosis  =  -0.110706912589
n_points  =  351
period  =  1.22786636438
period_SNR  =  39.1632573328
period_log10FAP  =  -29.4693195444
period_uncertainty  =  0.000417925970373
phase_cusum  =  0.319994115106
phase_eta  =  0.939304713309
phi21  =  0.678527283138
phi31  =  -1.24369328481
quartile31  =  0.51
r21  =  0.294358929399
r31  =  0.329780002458
shapiro_w  =  0.992581009865
skewness  =  0.135012953926
slope_per10  =  -0.0788488558548
slope_per90  =  0.0730814250868
stetson_k  =  0.76103585092
weighted_mean  =  19.0343211579
weighted_std  =  0.367759636549
