-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.310365163142
cusum  =  0.279301480937
eta  =  0.653349206793
hl_amp_ratio  =  1.15966989709
kurtosis  =  -1.21441278936
n_points  =  32
period  =  0.111788151849
period_SNR  =  5.83357498354
period_log10FAP  =  -0.488364672642
period_uncertainty  =  3.18239963389e-06
phase_cusum  =  0.37361292209
phase_eta  =  0.597140665328
phi21  =  -1.68044031747
phi31  =  -4.58353601916
quartile31  =  0.445
r21  =  0.320588031551
r31  =  0.0860401331449
shapiro_w  =  0.947424888611
skewness  =  0.0178711632313
slope_per10  =  -0.0304257782776
slope_per90  =  0.0862624990987
stetson_k  =  0.845559373362
weighted_mean  =  14.465625
weighted_std  =  0.274191282456
