-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.73


######### Lightcurve features #########

amplitude  =  0.205754862457
cusum  =  0.140543570306
eta  =  1.49089010334
hl_amp_ratio  =  1.09965138677
kurtosis  =  0.175877381969
n_points  =  360
period  =  0.613348563461
period_SNR  =  35.2179241062
period_log10FAP  =  -19.8994232499
period_uncertainty  =  0.00012515615338
phase_cusum  =  0.232608215971
phase_eta  =  1.45684338943
phi21  =  1.03097426267
phi31  =  1.62844886456
quartile31  =  0.37
r21  =  0.356631583668
r31  =  0.127266905408
shapiro_w  =  0.988843679428
skewness  =  0.365779729552
slope_per10  =  -0.0568545216599
slope_per90  =  0.0529310742819
stetson_k  =  0.819233077663
weighted_mean  =  18.7850278525
weighted_std  =  0.246104213758
