-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.54


######### Lightcurve features #########

amplitude  =  0.164833332896
cusum  =  0.12624913244
eta  =  1.63267095848
hl_amp_ratio  =  0.751325003721
kurtosis  =  -0.124342378628
n_points  =  319
period  =  1.69087356835
period_SNR  =  24.3347331547
period_log10FAP  =  -9.00871508349
period_uncertainty  =  0.000792795351242
phase_cusum  =  0.163545279945
phase_eta  =  1.52457572209
phi21  =  3.77430126094
phi31  =  4.147462265
quartile31  =  0.365
r21  =  0.245619011351
r31  =  0.315077876321
shapiro_w  =  0.992986798286
skewness  =  -0.0404116061127
slope_per10  =  -0.0791691871806
slope_per90  =  0.0844103473048
stetson_k  =  0.7777084042
weighted_mean  =  19.3242439844
weighted_std  =  0.253696798729
