-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.21477977247
cusum  =  0.0905721843556
eta  =  0.706174260832
hl_amp_ratio  =  0.712109989633
kurtosis  =  -0.364056499097
n_points  =  263
period  =  0.60451597969
period_SNR  =  39.6080832662
period_log10FAP  =  -32.9148583325
period_uncertainty  =  0.000105111280643
phase_cusum  =  0.26887428737
phase_eta  =  0.251569241516
phi21  =  1.03062035281
phi31  =  2.23748575791
quartile31  =  0.29
r21  =  0.448748120693
r31  =  0.253163184469
shapiro_w  =  0.974450051785
skewness  =  -0.360034448868
slope_per10  =  -0.235959471257
slope_per90  =  0.243555799596
stetson_k  =  0.826956832687
weighted_mean  =  13.7433227682
weighted_std  =  0.184276531756
