-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.340229442451
cusum  =  0.175139561949
eta  =  0.570976809524
hl_amp_ratio  =  0.530902428226
kurtosis  =  -0.644334442105
n_points  =  253
period  =  0.496578623586
period_SNR  =  36.2539390234
period_log10FAP  =  -29.8659049794
period_uncertainty  =  0.000141863405358
phase_cusum  =  0.248921165371
phase_eta  =  0.293248279794
phi21  =  3.96048453884
phi31  =  4.82802218848
quartile31  =  0.48
r21  =  0.446391180147
r31  =  0.328593239657
shapiro_w  =  0.912705540657
skewness  =  -0.688990517195
slope_per10  =  -0.108378249785
slope_per90  =  0.305861928344
stetson_k  =  0.802127810392
weighted_mean  =  14.0399233379
weighted_std  =  0.311175231061
