-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.326129621596
cusum  =  0.211353667049
eta  =  0.575350996067
hl_amp_ratio  =  0.787900551285
kurtosis  =  -0.831913452922
n_points  =  102
period  =  0.186865703866
period_SNR  =  12.0438184791
period_log10FAP  =  -7.88581753195
period_uncertainty  =  9.30958451961e-06
phase_cusum  =  0.319051453201
phase_eta  =  0.692636493614
phi21  =  0.228447178756
phi31  =  -0.875174902666
quartile31  =  0.4575
r21  =  0.201922948254
r31  =  0.210957865901
shapiro_w  =  0.943286716938
skewness  =  -0.43202216671
slope_per10  =  -0.0299071729845
slope_per90  =  0.152880003676
stetson_k  =  0.837305483326
weighted_mean  =  15.7591003358
weighted_std  =  0.305337647225
