-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.263202785667
cusum  =  0.193733412969
eta  =  1.485937061
hl_amp_ratio  =  1.06094409925
kurtosis  =  -0.00720961885589
n_points  =  357
period  =  0.619798651454
period_SNR  =  37.0114601478
period_log10FAP  =  -21.870288242
period_uncertainty  =  0.00010649461667
phase_cusum  =  0.25015548606
phase_eta  =  1.30957780536
phi21  =  -2.00426844802
phi31  =  -1.79310350226
quartile31  =  0.46
r21  =  0.430629635193
r31  =  0.0372116313773
shapiro_w  =  0.992547512054
skewness  =  0.20981711012
slope_per10  =  -0.0357230597347
slope_per90  =  0.030383125329
stetson_k  =  0.806180494007
weighted_mean  =  19.0325337055
weighted_std  =  0.325537446859
