-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.290462311113
cusum  =  0.131299968648
eta  =  0.704749056076
hl_amp_ratio  =  0.826228888475
kurtosis  =  -0.616907010697
n_points  =  258
period  =  0.640678433832
period_SNR  =  34.0673757898
period_log10FAP  =  -28.4273583584
period_uncertainty  =  0.00014014111509
phase_cusum  =  0.234095737381
phase_eta  =  0.380022797332
phi21  =  1.34776049613
phi31  =  -0.557603806834
quartile31  =  0.36
r21  =  0.521004752372
r31  =  0.277863197
shapiro_w  =  0.970452487469
skewness  =  -0.310827187116
slope_per10  =  -0.175592798383
slope_per90  =  0.240450400398
stetson_k  =  0.825432157345
weighted_mean  =  14.2989192347
weighted_std  =  0.251333325533
