-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.216206698002
cusum  =  0.122154437018
eta  =  0.696891054617
hl_amp_ratio  =  0.690712961271
kurtosis  =  -0.937681521374
n_points  =  286
period  =  0.699260142448
period_SNR  =  40.2770040182
period_log10FAP  =  -32.6803575465
period_uncertainty  =  0.000139128565265
phase_cusum  =  0.264735540031
phase_eta  =  0.305885257798
phi21  =  -1.92249664154
phi31  =  -0.618535770146
quartile31  =  0.2975
r21  =  0.481083827966
r31  =  0.347718468775
shapiro_w  =  0.96441078186
skewness  =  -0.286088342815
slope_per10  =  -0.165789726581
slope_per90  =  0.248598877844
stetson_k  =  0.835588266547
weighted_mean  =  15.0058648182
weighted_std  =  0.181300291807
