<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.379024594234
cusum  =  0.127901857191
eta  =  0.527881046636
hl_amp_ratio  =  0.460777730511
kurtosis  =  -0.678018449358
n_points  =  364
period  =  0.604061792604
period_SNR  =  44.7768165324
period_log10FAP  =  -52.2503075988
period_uncertainty  =  0.000121395059687
phase_cusum  =  0.302079899369
phase_eta  =  0.247310268004
phi21  =  4.04551736768
phi31  =  4.97248568699
quartile31  =  0.49
r21  =  0.392018746184
r31  =  0.230105992065
shapiro_w  =  0.902320981026
skewness  =  -0.644168153132
slope_per10  =  -0.0912146380786
slope_per90  =  0.179860121871
stetson_k  =  0.774086457294
weighted_mean  =  14.5389607116
weighted_std  =  0.321544967288
</pre></body></html>