-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.228398180465
cusum  =  0.134437383903
eta  =  0.523133932701
hl_amp_ratio  =  0.777712679702
kurtosis  =  -0.840078120825
n_points  =  320
period  =  0.601647284134
period_SNR  =  32.2638497414
period_log10FAP  =  -31.4316993062
period_uncertainty  =  0.000121758090011
phase_cusum  =  0.258723953194
phase_eta  =  0.797946660942
phi21  =  0.664002151898
phi31  =  -0.492276037572
quartile31  =  0.3325
r21  =  0.34074494318
r31  =  0.150045642579
shapiro_w  =  0.978418052197
skewness  =  -0.178377490389
slope_per10  =  -0.127999996766
slope_per90  =  0.0801666639745
stetson_k  =  0.831706223525
weighted_mean  =  12.3840292276
weighted_std  =  0.216361174451
