<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.352050552594
cusum  =  0.114810763764
eta  =  0.465387528629
hl_amp_ratio  =  0.443170803368
kurtosis  =  -0.499300511051
n_points  =  389
period  =  0.560715024667
period_SNR  =  45.081086434
period_log10FAP  =  -48.1078139219
period_uncertainty  =  8.53811422138e-05
phase_cusum  =  0.248935552953
phase_eta  =  0.251905306094
phi21  =  -2.41032932567
phi31  =  -1.51143210496
quartile31  =  0.39
r21  =  0.416840538048
r31  =  0.297964110222
shapiro_w  =  0.901322066784
skewness  =  -0.790867278407
slope_per10  =  -0.101850384757
slope_per90  =  0.0905610198684
stetson_k  =  0.765800390429
weighted_mean  =  15.6269134713
weighted_std  =  0.290868859086
</pre></body></html>