-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.255723555823
cusum  =  0.140576346184
eta  =  0.558592749828
hl_amp_ratio  =  0.333160143714
kurtosis  =  0.0644174969975
n_points  =  351
period  =  0.682806564079
period_SNR  =  42.4732627041
period_log10FAP  =  -44.5696668387
period_uncertainty  =  0.000130675684776
phase_cusum  =  0.243393800973
phase_eta  =  0.431843075309
phi21  =  0.800705790152
phi31  =  2.0984283902
quartile31  =  0.29
r21  =  0.38835495883
r31  =  0.122731254452
shapiro_w  =  0.899933934212
skewness  =  -0.971212143372
slope_per10  =  -0.154055814734
slope_per90  =  0.196712514274
stetson_k  =  0.729133814631
weighted_mean  =  13.0894338725
weighted_std  =  0.215395357411
