-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.44


######### Lightcurve features #########

amplitude  =  0.0140520453156
cusum  =  0.0649853366328
eta  =  2.27606651854
hl_amp_ratio  =  1.12715827912
kurtosis  =  4.24850075345
n_points  =  373
period  =  1.44863624357
period_SNR  =  12.3057423499
period_log10FAP  =  -0.289873400626
period_uncertainty  =  0.000790740538384
phase_cusum  =  0.082303390863
phase_eta  =  2.1301939262
phi21  =  -1.94056893656
phi31  =  -3.9788095226
quartile31  =  0.04
r21  =  0.0200623073778
r31  =  0.521715610542
shapiro_w  =  0.934917092323
skewness  =  -0.0514418859917
slope_per10  =  -0.340849990025
slope_per90  =  0.418027810113
stetson_k  =  0.72281581486
weighted_mean  =  16.3800634104
weighted_std  =  0.037693708581
