-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.523756562899
cusum  =  0.0837267782509
eta  =  0.637530333834
hl_amp_ratio  =  0.199916558984
kurtosis  =  -0.197687947788
n_points  =  255
period  =  0.531034801264
period_SNR  =  39.8337546735
period_log10FAP  =  -33.9719232521
period_uncertainty  =  0.000122334093657
phase_cusum  =  0.228359042497
phase_eta  =  0.0621014321559
phi21  =  0.732103479145
phi31  =  1.38473504552
quartile31  =  0.63
r21  =  0.427514352168
r31  =  0.29657857213
shapiro_w  =  0.838332235813
skewness  =  -1.02035875683
slope_per10  =  -0.14800611084
slope_per90  =  0.220865189618
stetson_k  =  0.690087050582
weighted_mean  =  11.5509625932
weighted_std  =  0.424063978069
