-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.23061884292
cusum  =  0.0831163807172
eta  =  0.577997153713
hl_amp_ratio  =  0.723207137425
kurtosis  =  -0.965738689925
n_points  =  406
period  =  0.702305515573
period_SNR  =  44.8820357306
period_log10FAP  =  -50.4642365144
period_uncertainty  =  0.000132720829173
phase_cusum  =  0.213654569216
phase_eta  =  0.266739104912
phi21  =  0.862514507964
phi31  =  2.12443083946
quartile31  =  0.33
r21  =  0.436955580049
r31  =  0.269505618333
shapiro_w  =  0.959280431271
skewness  =  -0.212386945506
slope_per10  =  -0.135466888847
slope_per90  =  0.232446333814
stetson_k  =  0.841236299309
weighted_mean  =  15.634804158
weighted_std  =  0.203790051795
