-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.240373343945
cusum  =  0.126128300871
eta  =  1.46222501298
hl_amp_ratio  =  1.05402739976
kurtosis  =  -0.0492478397294
n_points  =  379
period  =  0.713468191313
period_SNR  =  32.2092774028
period_log10FAP  =  -19.6488532894
period_uncertainty  =  0.000141135507618
phase_cusum  =  0.169350202395
phase_eta  =  1.36456135956
phi21  =  -1.71771875946
phi31  =  -0.478844035577
quartile31  =  0.435
r21  =  0.496775343427
r31  =  0.21914636024
shapiro_w  =  0.994197785854
skewness  =  0.236507607328
slope_per10  =  -0.0447257494226
slope_per90  =  0.0391013207338
stetson_k  =  0.800422548133
weighted_mean  =  19.039812821
weighted_std  =  0.31270527155
