-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.382002887606
cusum  =  0.118778636444
eta  =  0.667766900031
hl_amp_ratio  =  0.233144888974
kurtosis  =  -0.474976451611
n_points  =  403
period  =  0.516489540223
period_SNR  =  48.3761303696
period_log10FAP  =  -51.9247747276
period_uncertainty  =  0.000114845642152
phase_cusum  =  0.23236004965
phase_eta  =  0.0833447718717
phi21  =  0.817274350578
phi31  =  1.84449976312
quartile31  =  0.52
r21  =  0.508165805153
r31  =  0.36065056817
shapiro_w  =  0.861304759979
skewness  =  -0.843549503684
slope_per10  =  -0.0735401674415
slope_per90  =  0.164342142969
stetson_k  =  0.690808236878
weighted_mean  =  15.8041749734
weighted_std  =  0.330896408995
