-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.358669752937
cusum  =  0.18598983053
eta  =  0.544573776176
hl_amp_ratio  =  0.586383672977
kurtosis  =  -1.03570616989
n_points  =  256
period  =  0.691040418202
period_SNR  =  41.2534336301
period_log10FAP  =  -34.9205745378
period_uncertainty  =  0.000207252928607
phase_cusum  =  0.248853754793
phase_eta  =  0.061350691704
phi21  =  -1.75159842795
phi31  =  -0.41685390087
quartile31  =  0.5025
r21  =  0.482264077415
r31  =  0.333310220849
shapiro_w  =  0.936880290508
skewness  =  -0.400618977941
slope_per10  =  -0.1727566383
slope_per90  =  0.434000010137
stetson_k  =  0.840408736619
weighted_mean  =  11.7485676626
weighted_std  =  0.316021254777
