-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.241107346856
cusum  =  0.133978625864
eta  =  0.572984452711
hl_amp_ratio  =  0.535118589176
kurtosis  =  -1.01483708888
n_points  =  392
period  =  0.735524300163
period_SNR  =  45.3060984006
period_log10FAP  =  -48.9711854745
period_uncertainty  =  0.000149996804292
phase_cusum  =  0.257722466175
phase_eta  =  0.368241481919
phi21  =  -2.25425037697
phi31  =  -4.95559519272
quartile31  =  0.3925
r21  =  0.369246224437
r31  =  0.254123704783
shapiro_w  =  0.931675434113
skewness  =  -0.470103208948
slope_per10  =  -0.103919009813
slope_per90  =  0.0947517820498
stetson_k  =  0.809814025646
weighted_mean  =  17.0689541549
weighted_std  =  0.225067745239
