<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.55


######### Lightcurve features #########

amplitude  =  0.236113114778
cusum  =  0.209997179773
eta  =  1.65464568609
hl_amp_ratio  =  0.87451606088
kurtosis  =  -0.123275753821
n_points  =  369
period  =  0.391317823295
period_SNR  =  32.622674454
period_log10FAP  =  -17.5684587922
period_uncertainty  =  4.24551737747e-05
phase_cusum  =  0.198367818607
phase_eta  =  1.56888876086
phi21  =  -2.78964939288
phi31  =  -4.65500452004
quartile31  =  0.39
r21  =  0.392633288757
r31  =  0.100828343053
shapiro_w  =  0.99684637785
skewness  =  0.0866124529315
slope_per10  =  -0.0249699457767
slope_per90  =  0.023939561051
stetson_k  =  0.781647910359
weighted_mean  =  19.3479298621
weighted_std  =  0.282428798163
</pre></body></html>