-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.281337482066
cusum  =  0.159250895114
eta  =  0.545958578712
hl_amp_ratio  =  0.419689991741
kurtosis  =  -0.550901399353
n_points  =  378
period  =  0.694140879079
period_SNR  =  40.8948637681
period_log10FAP  =  -43.6802688168
period_uncertainty  =  0.000131406349947
phase_cusum  =  0.22876757358
phase_eta  =  0.115730013546
phi21  =  1.10189233216
phi31  =  2.33223526848
quartile31  =  0.345
r21  =  0.549475093928
r31  =  0.29452692349
shapiro_w  =  0.909819424152
skewness  =  -0.753948618055
slope_per10  =  -0.149184131102
slope_per90  =  0.323793056144
stetson_k  =  0.760840206209
weighted_mean  =  13.117962963
weighted_std  =  0.233400962317
