-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.240222396932
cusum  =  0.115834213749
eta  =  0.52310331918
hl_amp_ratio  =  0.38122061332
kurtosis  =  -0.630553951432
n_points  =  386
period  =  0.675837396883
period_SNR  =  49.233474245
period_log10FAP  =  -54.3528765152
period_uncertainty  =  0.00014697443179
phase_cusum  =  0.237276137558
phase_eta  =  0.229563327122
phi21  =  4.06233832599
phi31  =  5.13127406502
quartile31  =  0.32
r21  =  0.405694565636
r31  =  0.288669291809
shapiro_w  =  0.921192169189
skewness  =  -0.683326774006
slope_per10  =  -0.168401094369
slope_per90  =  0.123449998209
stetson_k  =  0.76494169811
weighted_mean  =  16.4173940213
weighted_std  =  0.205186231421
