-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.254292609491
cusum  =  0.115184323327
eta  =  0.673723588143
hl_amp_ratio  =  0.537006184377
kurtosis  =  -0.410191255381
n_points  =  418
period  =  0.612455687557
period_SNR  =  53.4062115716
period_log10FAP  =  -57.9912255116
period_uncertainty  =  0.000120199341452
phase_cusum  =  0.25585477756
phase_eta  =  0.366576615122
phi21  =  0.907357466904
phi31  =  -1.04423654501
quartile31  =  0.3275
r21  =  0.32554083931
r31  =  0.201811643002
shapiro_w  =  0.950265824795
skewness  =  -0.554472060056
slope_per10  =  -0.0993270668145
slope_per90  =  0.106100676959
stetson_k  =  0.794904101293
weighted_mean  =  16.3468449782
weighted_std  =  0.211494103578
