-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.320039552274
cusum  =  0.120032633758
eta  =  0.559121450604
hl_amp_ratio  =  0.692663462715
kurtosis  =  -1.07781039247
n_points  =  335
period  =  0.62212905641
period_SNR  =  39.4804428034
period_log10FAP  =  -41.199075774
period_uncertainty  =  0.00010633957915
phase_cusum  =  0.272810090337
phase_eta  =  0.0459745728419
phi21  =  4.05168737867
phi31  =  5.35023872101
quartile31  =  0.505
r21  =  0.513955943518
r31  =  0.330027479191
shapiro_w  =  0.942993164062
skewness  =  -0.333838834873
slope_per10  =  -0.272120086973
slope_per90  =  0.346950010862
stetson_k  =  0.836635435542
weighted_mean  =  13.9389861415
weighted_std  =  0.284662635413
