-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.274461575662
cusum  =  0.111565258542
eta  =  0.487720808291
hl_amp_ratio  =  0.425913873222
kurtosis  =  -0.462086249677
n_points  =  389
period  =  0.580373706424
period_SNR  =  41.269857599
period_log10FAP  =  -46.3972368053
period_uncertainty  =  0.000108386527639
phase_cusum  =  0.246654818257
phase_eta  =  0.231216751179
phi21  =  0.821252344312
phi31  =  1.77388494229
quartile31  =  0.35
r21  =  0.485521929691
r31  =  0.345579450168
shapiro_w  =  0.926060974598
skewness  =  -0.692510737258
slope_per10  =  -0.0859846270591
slope_per90  =  0.19753163141
stetson_k  =  0.779273219023
weighted_mean  =  15.0484889768
weighted_std  =  0.248216706257
