-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.270766293672
cusum  =  0.074143177183
eta  =  0.577075068001
hl_amp_ratio  =  0.515667884337
kurtosis  =  -1.11028071036
n_points  =  383
period  =  0.671646366976
period_SNR  =  45.6327455866
period_log10FAP  =  -52.6391560553
period_uncertainty  =  0.000145158071828
phase_cusum  =  0.285070663297
phase_eta  =  0.107342760674
phi21  =  -2.27071289679
phi31  =  -4.07995812765
quartile31  =  0.44
r21  =  0.453113416352
r31  =  0.368179244043
shapiro_w  =  0.92762774229
skewness  =  -0.377304231227
slope_per10  =  -0.143984460897
slope_per90  =  0.239400006831
stetson_k  =  0.826600646398
weighted_mean  =  15.0292690333
weighted_std  =  0.254954766095
