-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.280516531139
cusum  =  0.0977171698613
eta  =  0.54378393909
hl_amp_ratio  =  0.448129210322
kurtosis  =  -0.71869506691
n_points  =  422
period  =  0.65751048054
period_SNR  =  42.5441036975
period_log10FAP  =  -47.9215758791
period_uncertainty  =  0.000115474271164
phase_cusum  =  0.23138136519
phase_eta  =  0.218469250897
phi21  =  1.04523715863
phi31  =  2.25350697201
quartile31  =  0.36
r21  =  0.526011995957
r31  =  0.336881715876
shapiro_w  =  0.92765134573
skewness  =  -0.59150700321
slope_per10  =  -0.108210161963
slope_per90  =  0.16709089327
stetson_k  =  0.757244187588
weighted_mean  =  16.4171217127
weighted_std  =  0.245858691234
