-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.377085259124
cusum  =  0.0777187694863
eta  =  0.521110356121
hl_amp_ratio  =  0.399926112571
kurtosis  =  -0.750391592813
n_points  =  418
period  =  0.613415467151
period_SNR  =  48.2764853102
period_log10FAP  =  -56.2769426669
period_uncertainty  =  0.000121508515923
phase_cusum  =  0.226896657031
phase_eta  =  0.0592793964034
phi21  =  -2.2613593356
phi31  =  -4.19587837543
quartile31  =  0.49
r21  =  0.500654837416
r31  =  0.275185502004
shapiro_w  =  0.905310332775
skewness  =  -0.686570183586
slope_per10  =  -0.137311150913
slope_per90  =  0.242200009525
stetson_k  =  0.749457950583
weighted_mean  =  14.6441742571
weighted_std  =  0.331055356756
