-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.253852673553
cusum  =  0.142174782585
eta  =  0.616464110408
hl_amp_ratio  =  0.51825210888
kurtosis  =  0.747100955499
n_points  =  303
period  =  0.562380932392
period_SNR  =  23.6508892256
period_log10FAP  =  -20.8818402956
period_uncertainty  =  0.000104454114375
phase_cusum  =  0.184074481355
phase_eta  =  0.62842659733
phi21  =  3.97118787333
phi31  =  5.22333565277
quartile31  =  0.33
r21  =  0.683418990297
r31  =  0.431276936325
shapiro_w  =  0.932132840157
skewness  =  -0.988984359569
slope_per10  =  -0.0991478495908
slope_per90  =  0.103389296679
stetson_k  =  0.741561151247
weighted_mean  =  11.8951073198
weighted_std  =  0.27047951068
