-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.347887503948
cusum  =  0.165074030634
eta  =  1.12142838019
hl_amp_ratio  =  0.209467748003
kurtosis  =  -1.27373843998
n_points  =  249
period  =  0.731842556356
period_SNR  =  14.6445049552
period_log10FAP  =  -9.08881034411
period_uncertainty  =  0.000143195308612
phase_cusum  =  0.209106309765
phase_eta  =  0.953900704702
phi21  =  -0.392172025816
phi31  =  -3.23917214312
quartile31  =  0.83
r21  =  0.316399919818
r31  =  0.252192974002
shapiro_w  =  0.847288429737
skewness  =  -0.572809224588
slope_per10  =  -0.0976956897918
slope_per90  =  0.0706672730146
stetson_k  =  0.697801352876
weighted_mean  =  15.9141125639
weighted_std  =  0.475971628104
