<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_F
class_probability =  0.45


######### Lightcurve features #########

amplitude  =  0.148372522552
cusum  =  0.124020292741
eta  =  0.539919457157
hl_amp_ratio  =  0.825797058775
kurtosis  =  -0.470735601987
n_points  =  194
period  =  1.25712480178
period_SNR  =  18.9864700604
period_log10FAP  =  -12.8062228597
period_uncertainty  =  0.000373311035676
phase_cusum  =  0.205927977892
phase_eta  =  1.08954237028
phi21  =  -1.08727938868
phi31  =  -0.0645888888664
quartile31  =  0.2175
r21  =  0.368607268293
r31  =  0.267861283557
shapiro_w  =  0.958928346634
skewness  =  -0.492269231024
slope_per10  =  -0.263740195426
slope_per90  =  0.490900001023
stetson_k  =  0.801678582502
weighted_mean  =  13.4910428125
weighted_std  =  0.161092848333
</pre></body></html>