-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.67


######### Lightcurve features #########

amplitude  =  0.319859591429
cusum  =  0.194639390946
eta  =  0.595886207787
hl_amp_ratio  =  0.916493453826
kurtosis  =  -0.928315603719
n_points  =  79
period  =  0.628497614931
period_SNR  =  13.8834423973
period_log10FAP  =  -7.7951313453
period_uncertainty  =  0.000203150764115
phase_cusum  =  0.318630270219
phase_eta  =  0.281866554651
phi21  =  0.777245033948
phi31  =  1.95751807304
quartile31  =  0.47
r21  =  0.437709966734
r31  =  0.290109332387
shapiro_w  =  0.942542135715
skewness  =  -0.386321411257
slope_per10  =  -0.188988768618
slope_per90  =  0.754299974069
stetson_k  =  0.835204450309
weighted_mean  =  15.3507519754
weighted_std  =  0.258664757761
