-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.26


######### Lightcurve features #########

amplitude  =  0.196156802205
cusum  =  0.261834793699
eta  =  0.562816717133
hl_amp_ratio  =  1.14085464994
kurtosis  =  -0.668727635385
n_points  =  141
period  =  0.989360671668
period_SNR  =  13.1764769498
period_log10FAP  =  -6.72902686913
period_uncertainty  =  0.000471180322463
phase_cusum  =  0.203844759596
phase_eta  =  0.923047759288
phi21  =  -2.12476311441
phi31  =  -4.29634333661
quartile31  =  0.4
r21  =  0.0280173191178
r31  =  0.177716442769
shapiro_w  =  0.97156393528
skewness  =  0.248160508832
slope_per10  =  -0.409075005446
slope_per90  =  0.636700014584
stetson_k  =  0.840361681873
weighted_mean  =  9.24574821853
weighted_std  =  0.228951391034
